0 50 100 150 200 250 300 350 400 〉_{part} N〈 0

0.05

0.1

0.15

0.2

0.25

(1S) ϒN / (2S) ϒN

= 5.02 TeV NNs Pb −Pb < 4.0 y ALICE, 2.5 < Statistical hadronisation model

(2S) = 8.8% ϒ (1S) = 2.0%, ϒ BR uncertainties:

ALI-PUB-499464

ALI-PUB-499464